\section{ZEPLAY 2.0.6 Release Notes}
\begin{description}

\item[{\color{red}
\textbf{6273} \textbf{ZEPLAY sometimes plays back corrupt audio}
\textbf{Fixed an issue that could cause audio distortion on playback.}
\item[{\color{red}
\textbf{6346} \textbf{Storyboard window sometimes unexpectedly resets scroll}
\textbf{Fixed an issue that would cause the storyboard to scroll back to the right.  This problem could lead to Paste operations putting items in the wrong spot as well.}
\item[{\color{red}
\textbf{6537} \textbf{Interruption of Incoming SDI signal can cause momentary disruption of output signal}
\textbf{An interruption of incoming SDI e.g. disconnecting the cable, will no longer cause the output video to flash to black.}
\item[{\color{red}
\textbf{6541} \textbf{ATTO Raid monitoring sometimes 'cries wolf', when there is in fact nothing wrong}
\textbf{Fixed a problem that was causing the ATTO Raid monitoring code to incorrectly report an error.}
\item[{\color{red}
\textbf{6727} \textbf{Incoming AES audio can be interrupted when using certain Analog to AES converters}
\textbf{We fixed an issue that would cause the audio input to mute the signal for very short periods of time when using specific Analog to AES converters.}
\end{description}

