\section{Cablecast 6.3.2 Release Notes}
\begin{description}

\item[{\color{red}
\textbf{CC-787} \textbf{Inactive Devices Are Displayed In Force Matrix}
\textbf{Fixed an issue where devices that are marked as inactive were incorrectly displayed in the Force Matrix.}
\item[{\color{red}
\textbf{CC-786} \textbf{Scaling Can Cause Invalid AFD Codes}
\textbf{Fixed an issue where some combinations of file resolution and play out resolution could cause invalid AFD codes.}
\end{description}

