\section{Cablecast 6.2.5 Release Notes}
\begin{description}

\item[{\color{red}
\textbf{CC-671} \textbf{Live Stream Can Get Stuck After Maintenance Routine}
\textbf{Fixed an issue where the stream would not restart after a maintenance task if there was a glitch in the stream. The stream will now attempt to restart after the glitch until the stream is running.}
\item[{\color{red}
\textbf{CC-267} \textbf{Drop Flash Requirement For Desktop Live Stream Viewing}
\textbf{Update the live stream player to use media source extensions api, eliminating the need to load the HLS stream in a flash plugin on browsers that do not natively support HLS.}
\item[{\color{red}
\textbf{CC-681} \textbf{Configuring Flex 4 Server As 2 In and 2 Out Sets Wrong Resolution For Second Encode Channel}
\textbf{Fixed an issue where the second encode channel would not be set to the same resolution as the first encode channel when configuring a Flex 4 for 2 in and 2 out mode.}
\item[{\color{red}
\textbf{CC-680} \textbf{Public Site Galleries Do Not Maintain Order When Saved}
\textbf{Fixed an issue where the order of galleries on the public site would not persist correctly. You can now order your galleries without issue. }
\end{description}

