\section{Cablecast 6.2.4 Release Notes}
\begin{description}

\item[{\color{red}
\textbf{CC-551} \textbf{List Total Run Time Of All Runs In Reporting Totals Table}
\textbf{The total table in reports now contains the total run time of all runs.}
\item[{\color{red}
\textbf{CC-509} \textbf{Flex I/O Configuration Utility Doesn't Always Apply Settings.}
\textbf{Fixed an issue with the Flex I/O Configuration utility where it was not saving the configuration to the correct location resulting in a  corrupt config. The Flex I/O Configuration Utility now works as expected}
\item[{\color{red}
\textbf{CC-550} \textbf{Average Run Length In Reports Is Incorrect}
\textbf{Fixed an issue where the average run length in the total table was always the same incorrect value. This value is now calculated properly. }
\item[{\color{red}
\textbf{CC-608} \textbf{Live Streaming Background Tasks Perform Poorly On Large Systems}
\textbf{Improved the performance of the background task responsible for controlling live streams. Poor performance could lead to random errors in other parts of the software such as scheduling.}
\item[{\color{red}
\textbf{CC-523} \textbf{Gallery Page in Public Site Does Not Show Correct Results}
\textbf{Fixed an issue where proper results were not shown in public site galleries. The public site galleries now show all expected shows. }
\item[{\color{red}
\textbf{CC-588} \textbf{Live Streams Can Become Stuck After Nightly Maintenance}
\textbf{Fixed an issue where the live stream could be stuck after nightly maintenance causing the stream to never recover.}
\end{description}

