\section{Frontdoor 5.3.2 Release Notes}
\begin{description}

\item[{\color{red}
\textbf{3620} \textbf{Tightrope Time Sync does not turn off Windows Time Sync }
\textbf{Fixed some inconsistencies in how we handled time synchronization within FrontDoor.}
\item[{\color{red}
\textbf{3740} \textbf{Login page can throw a Null Reference exception when refreshing after an error.}
\textbf{The error page now redirects to the main menu if the error has been cleared.}
\item[{\color{red}
\textbf{3741} \textbf{5.0 Migration Tool uses and out of range date value when migrating TimeSync table}
\textbf{Now using the correct date values when migrating data to the 5.0 database schema.}
\item[{\color{red}
\textbf{3768} \textbf{FrontDoor server security setting doesn't update the timeout values in Carousel or Cablecast}
\textbf{The Server Timeout value in FrontDoor's server security settings is now correctly applied to Carousel and Cablecast. This fix requires Carousel 5.2.4 and Cablecast 4.8.2 to be effective.}
\end{description}

