\section{Cablecast 6.2.1 Release Notes}
\begin{description}

\item[{\color{red}
\textbf{CC-188} \textbf{Public Site Should not Limit Number of Schedule Results}
\textbf{Fixed an issue where schedules on the public site would not show more than 200 scheduled shows per day. All public site schedules will now accurately display all shows that are not marked CG exempt regardless of the amount.}
\item[{\color{red}
\textbf{CC-220} \textbf{Add Redirect for Old Public Site URL}
\textbf{Fixed an issue where the old public site URL would not redirect to the new public site. All links pointing to the old URL (/Cablecast/public-site) will be redirected to the new URL (/CablecastPublicSite).}
\item[{\color{red}
\textbf{CC-238} \textbf{Live Stream Control Buttons Do Not Affect Stream}
\textbf{Fixed an issue where clicking the stop or start button on the live streams screen would not affect the stream state.}
\end{description}

