\section{Cablecast 6.0.10 Release Notes}
\begin{description}

\item[{\color{red}
\textbf{CC-188} \textbf{Public Site Should not Limit Number of Schedule Results}
\textbf{Fixed an issue where schedules on the public site would not show more than 200 scheduled shows per day. All public site schedules will now accurately display all shows that are not marked CG exempt regardless of the amount.}
\item[{\color{red}
\textbf{CC-378} \textbf{Public Site Does Not Filter Cleared Shows}
\textbf{Fixed an issue where shows that have been cleared in Cablecast would still appear on the front page and in search results of the Cablecast Public Site. These shows are now filtered out correctly.}
\item[{\color{red}
\textbf{CC-217} \textbf{Clicking The Edit Crawl Button On Touch Devices Does Not Work}
\textbf{Fixed an issue where the edit button for crawls was not considered an interactive element on touch devices and therefore could not be clicked.}
\item[{\color{red}
\textbf{CC-380} \textbf{Third Party iFrames Do Not Display In Show Record}
\textbf{Fixed an issue where configured iFrames were not displayed in the show record. The iFrames are now displayed correctly.}
\item[{\color{red}
\textbf{CC-216} \textbf{Canceling show does not role back reel changes}
\textbf{Fixed a bug where canceling out of editing a show would appear to persist some of the changes made to the show until a browser refresh. All changes in the show record are now reverted when canceled.  }
\item[{\color{red}
\textbf{CC-377} \textbf{Live Streaming and VOD Configuration Incorrectly Validate Trailing Whitespace}
\textbf{Fixed an issue where trailing whitespace in a URL configuration field would validate correctly but generate bad embed codes. The trailing whitespace is now removed when saving the configuration.}
\end{description}

