\section{Carousel-for-BrightSign-Players 1.3.2 Release Notes}
\begin{description}

\item[{\color{red}
\textbf{9759} \textbf{Clock Bulletins Display a Black Screen as the Bulletin Loads}
\textbf{Optimized how we load digital and analog clocks, so they don't momentarily drop to a black screen.}
\item[{\color{red}
\textbf{9766} \textbf{Players do not Automatically Update Firmware}
\textbf{Fixed an issue that would prevent connected BrightSign players from updating to the latest firmware automatically.  Players will now update as expected once the updated deployment tool is installed on the Carousel Server.}
\end{description}

