\section{Carousel 6.2.3 Release Notes}
\begin{description}

\item[{\color{red}
\textbf{5994} \textbf{EDS Fails to Render with Empty Field}
\textbf{Resolved an error that was being thrown whenever certain text fields in EDS bulletins wound up being empty. This was preventing the bulletin from being updated with new data.}
\item[{\color{red}
\textbf{6539} \textbf{Player Tests all fail if ping blocked}
\textbf{When running the Display Engine connection tests, if the ping test fails, then the rest of the tests were being skipped. In some networks, ICMP pings are intentionally blocked, so you'd never be able to run all the tests. We now continue with the connection tests even if pings aren't allowed.}
\item[{\color{red}
\textbf{6564} \textbf{Uploaded weather backgrounds not shown in template editor}
\textbf{If you upload a custom background when creating a new weather bulletin, the newly-uploaded background for the "Unknown" condition will now be used as the default background whenever editing the bulletin's template.}
\item[{\color{red}
\textbf{6599} \textbf{Editing a bulletin that has been copied to another zone doesn't apply changes to all the copies}
\textbf{Fixed a case that prevented copies of a bulletin on other zones from receiving edits. Note: You must click the "More..." button when making edits to select which copies to apply the changes to. If you simply click "Finish," edits will only be applied to the bulletin on the zone you're working on.}
\item[{\color{red}
\textbf{6600} \textbf{Edits to a bulletin in a group can cause multiple email notifications}
\textbf{Fixed a bug that would send a "waiting for approval" email out for every bulletin in a group, even if you only edit a single bulletin in that group.}
\item[{\color{red}
\textbf{6691} \textbf{EDS bulletins always get set to Ungrouped upon edit}
\textbf{EDS bulletins now retain their grouped setting across edits.}
\item[{\color{red}
\textbf{6695} \textbf{EDS bulletins don't wrap correctly}
\textbf{A small math error would cause certain fields in EDS bulletins to be piled on top of each other.}
\item[{\color{red}
\textbf{6717} \textbf{Rotation gets reset to 0 degrees in template editor}
\textbf{Resolved a problem where templates made in previous versions of the software would reset the rotation of text blocks to zero.}
\item[{\color{red}
\textbf{6725} \textbf{Display Engine Splash Screen occasionally hangs when clicking Configure button}
\textbf{We resolved a threading issue that would sometimes cause the Display Engine to appear frozen at the splash screen when you clicked the Configure button.}
\end{description}

