\section{Carousel 5.0.3 Release Notes}
\begin{description}

\item[{\color{red}
\textbf{2108} \textbf{Monitor offset not working as expected}
\textbf{A bug was found that caused the DisplayEngine to be shown on the primary monitor, regardless of the monitor offset value.  This has been fixed, and the monitor offset value should work as expected.}
\item[{\color{red}
\textbf{2111} \textbf{Updated user guide with a product feature chart}
\textbf{The manual now includes a feature chart that explains the differences between the various Carousel products.}
\end{description}

