\section{Carousel 4.2.2 Release Notes}
\begin{description}

\item[{\color{red}
\textbf{265} \textbf{NullReferenceException (Media.Backgrounds.Delete.aspx.cs:Page_Load:67) V4.2.0.0}
\textbf{A 'NullReferenceException' error occured when trying to delete backgrounds.}
\item[{\color{red}
\textbf{270} \textbf{InvalidOperationException (userpermissions.cs:PageAccess:358) V4.2.0.0}
\textbf{An 'InvalidOperationException' error occured when Carousel tried to verify the users security credentials.}
\item[{\color{red}
\textbf{271} \textbf{RSS Bulletins don't support newlines}
\textbf{Any <br/> tags will be treated as newlines in the RSS bulletins.}
\item[{\color{red}
\textbf{274} \textbf{FormatException (uitoolbox.cs:StringToTime:2270) V4.2.1.0}
\textbf{When editing a built-in EDS schedule, if you entered a bad EndTime value a 'FormatException' error would occur.}
\item[{\color{red}
\textbf{275} \textbf{TRMS Bulletin Objects should retry when saving to/loading from disk.}
\textbf{In some instances, if a bulletin's .dat file was is use Carousel would error. We corrected this by retrying if the file is in use.}
\item[{\color{red}
\textbf{298} \textbf{Page Validation Tool}
\textbf{Added the Carousel Page Validation tool to aid tech support in troubleshooting Carousel systems.}
\item[{\color{red}
\textbf{299} \textbf{Service should update WebUI to reflect corrupt bulletins}
\textbf{Added the ability to see corrupt bulletins in the Active pages list.}
\item[{\color{red}
\textbf{318} \textbf{NotSupportedException (Media.Sounds.AddNew.aspx.cs:Page_Load:81) V4.2.0.0}
\textbf{When adding new sound files from a non-Windows platform which had illigal characters in it cause a 'NotSupportedException' error.}
\item[{\color{red}
\textbf{325} \textbf{Deleting a single page causes "Cast not valid" error.}
\textbf{Deleting a single page caused "Cast not valid" error.}
\item[{\color{red}
\textbf{327} \textbf{Add EDS preview to public site}
\textbf{Added an EDS preview mode the the public web site.}
\item[{\color{red}
\textbf{328} \textbf{EDS Events are dropping off the list too fast}
\textbf{In EDS bulletins that were using the built-in event schedule, events were dropping off the list prior to their end time.}
\item[{\color{red}
\textbf{329} \textbf{Customers would like EDS to group by room and time}
\textbf{Added the ability to group EDS events by Room or by Time. This allows for 3 different styles of displaying events; ungrouped, group by room, group by time.}
\item[{\color{red}
\textbf{330} \textbf{Make dynamic pages update after they are edited}
\textbf{Dynamic pages like RSS and EDS bulletins were not updating/re-rendering after you editited them.}
\end{description}

