\section{Cablecast 5.4.8 Release Notes}
\begin{description}

\item[{\color{red}
\textbf{9393} \textbf{Intel RAIDs Report Unknown Status}
\textbf{Intel RAIDs in specific states of verifying would fail to report the correct state and, instead, return a status of unknown. Verifying states are now parsed correctly.}
\item[{\color{red}
\textbf{9522} \textbf{Video Servers Do Not Always Output Audio}
\textbf{The Cablecast Video Overlay application could cause SX and Flex video servers to not output audio if files were played using SXConfiguration or the Force Matrix. This would happen if the files were played before scheduled programming had aired at least once. Files played from the Force Matrix or SXConfiguration now properly output the correct audio.}
\item[{\color{red}
\textbf{9631} \textbf{Cablecast Device Control Service Can Fail To Bind To Network After Restart}
\textbf{The Cablecast Device Control Service would sometimes not close all the necessary subprocesses when exiting. This caused the service to not release the network connection, and would make the network unavailable after a restart. The service now ensures that all subprocesses are terminated before a restart.}
\item[{\color{red}
\textbf{9833} \textbf{Digital File Management Will Processes Bad Files Repeatedly}
\textbf{Fixed an issue where files that caused the file validation tool to crash would be processed repeatedly until the file was removed from the server. The file is now processed once unless re-indexed by a user.}
\end{description}

