\section{Cablecast 6.1.1 Release Notes}
\begin{description}

\item[{\color{red}
\textbf{9947} \textbf{Flex Servers Do Not Always Run Video Processing Application With Appropriate Privileges}
\textbf{The video processing applications would not request the appropriate privileges when started from a user context causing various configuration and playback issues. The applications now will request the appropriate privileges when starting.}
\item[{\color{red}
\textbf{9948} \textbf{Flex IO Configuration Tool Does Not Properly Detect Flex 4 Servers}
\textbf{The Flex IO Configuration Tool would incorrectly detect a Flex 4 server as a Flex 2 and only offer configuration options for two outputs. The tool now correctly detects Flex 4 servers and offers the correct configuration choices.}
\item[{\color{red}
\textbf{9949} \textbf{SXConfiguration Errors When Playing Files With Frame Rates Different Than Output Resolution}
\textbf{Fixed an issue where SXConfiguration would error when trying to play a file that was different than the output resolution.}
\end{description}

