\section{Cablecast 5.3.4 Release Notes}
\begin{description}

\item[{\color{red}
\textbf{7804} \textbf{Cablecast Device Control Service takes a long time to exit}
\textbf{The Cablecast Device Control service now exits immediately after being asked to Stop.}
\item[{\color{red}
\textbf{8483} \textbf{SX servers are not logging playback operations}
\textbf{Fixed a logging configuration issue that was causing SX servers not to log any playback operations.}
\item[{\color{red}
\textbf{8493} \textbf{Live streaming can get stuck in a restart loop}
\textbf{Fixed an issue with the process responsible for monitoring live streaming that could cause the stream to get stuck in a restart loop.}
\item[{\color{red}
\textbf{8522} \textbf{Lists on Digital File Management and VOD pages are not sorted by default}
\textbf{Fixed an issue that prevented initial sorting of VODs and Digital File Management pages.}
\item[{\color{red}
\textbf{8523} \textbf{Progress missing from list on VODs page}
\textbf{Fixed an issue on the VODs page that prevented the list of VODs from displaying progress.}
\item[{\color{red}
\textbf{8527} \textbf{RAID monitoring can become stuck which in turn can derail Digital File Managment}
\textbf{Fixed an issue that would cause the process responsible for monitoring raid status to get stuck. This also affected Digital File Management preventing new files from being recognized.}
\item[{\color{red}
\textbf{8601} \textbf{Some RAID statuses appear incorrectly as unknown in Autopilot send report}
\textbf{Fixed an issue that caused 'initializing' or 'verifying' RAID units to be marked as 'unknown' in Autopilot send reports.}
\item[{\color{red}
\textbf{8656} \textbf{Automatic database backups can timeout during upload}
\textbf{Increased the timeout for Automatic database backup uploads that would prevent larger databases from completely uploading over slow internet connections.}
\end{description}

