\section{Cablecast 5.2.8 Release Notes}
\begin{description}

\item[{\color{red}
\textbf{8331} \textbf{VOD "view" links show up for VODs that are not completed}
\textbf{View links now only show up when the VOD has finished transcoding.}
\item[{\color{red}
\textbf{8390} \textbf{Cablecast never re-discovers deleted VOD files}
\textbf{VODs that enter the deleted state can now be rediscovered.}
\item[{\color{red}
\textbf{8403} \textbf{SX Servers can't play HD 4:3 files}
\textbf{Files with a frame size of 1440x1080 pixels now play as intended.}
\item[{\color{red}
\textbf{8406} \textbf{Allow mezzination work folder to be configured}
\textbf{A configuration setting has been added which allows the VOD mezzination directory to be changed.}
\item[{\color{red}
\textbf{8411} \textbf{Source Incomplete VODs never progress}
\textbf{Fixed an issue where VODs that were waiting for source files would never be queued for transcoding, even after the source files were available.}
\item[{\color{red}
\textbf{8425} \textbf{Control Modules service sometimes leave subprocess running}
\textbf{CablecastDeviceControl service could leave utility processes running after it exited. These processes could interfere with the service's normal startup. CablecastDeviceControl now properly closes all utility processes before exiting.}
\end{description}

