\section{Cablecast 5.2.6 Release Notes}
\begin{description}

\item[{\color{red}
\textbf{7990} \textbf{Files may not be fully transcoded for VOD}
\textbf{Fixed an issue that would cause certain MPEG-2 files to be cut short during VOD transcoding.}
\item[{\color{red}
\textbf{8070} \textbf{Find and Replace Batch Function uses correct defaults for start and end times}
\textbf{The start and end times are now properly set to 12:00:00 AM and 11:59:59 PM respectively.}
\item[{\color{red}
\textbf{8143} \textbf{Public site displays "Watch Now" links for disabled VODs}
\textbf{The public site now only shows "Watch Now" links for enabled video on demand files.}
\item[{\color{red}
\textbf{8147} \textbf{MPEG-2 files with PCM audio fail VOD transcoding}
\textbf{MPEG-2 files with PCM audio can now be transcoded for video on demand.}
\item[{\color{red}
\textbf{8164} \textbf{Cablecast Service repeatedly logs database connection error}
\textbf{Fixed an issue in which the Cablecast Service was not closing a database connection before attempting to reopen it. The system would operate normally, but would fill the event logs with a related error message.}
\item[{\color{red}
\textbf{8167} \textbf{SQL migration fails on older databases}
\textbf{Fixed an issue that would cause database migrations to fail on systems migrating from Cablecast 4.8 and below.}
\item[{\color{red}
\textbf{8169} \textbf{Disabling VODs can cause VOD queue to stall}
\textbf{Fixed several issues related to the VOD queue becoming stuck after a VOD is disabled.}
\item[{\color{red}
\textbf{8178} \textbf{VOD transcoding can fail if a space is in the path of the source file}
\textbf{Fixed an issue with preparing source files that have spaces in the file's path.}
\item[{\color{red}
\textbf{8182} \textbf{Internet Explorer incorrectly caches control modules hosts status}
\textbf{Fixed an issue where Internet Explorer would cache the status of a Control Module Host resulting in incorrect status data being presented to the user.}
\end{description}

