\section{Cablecast 5.1.1 Release Notes}
\begin{description}

\item[{\color{red}
\textbf{7370} \textbf{Digital File Management page can have script errors in IE}
\textbf{We have reduced the script resources needed by the digital file management page in order to reduce the likelihood of these errors.}
\item[{\color{red}
\textbf{7490} \textbf{Control Module Hosts screen broken in IE}
\textbf{The installer was failing to install a requirement for the control module hosts screen to work in Internet Explorer. The file is now installed properly.}
\item[{\color{red}
\textbf{7506} \textbf{Cablecast Video Overlay app can crash when column headers are clicked}
\textbf{Fixed an issue that would cause an application crash when clicking the headers of the Cablecast Video Overlay App.}
\item[{\color{red}
\textbf{7524} \textbf{File Thumbnails Not Being Displayed}
\textbf{Fixed a configuration file issue that caused thumbnails not to show up on new Cablecast systems.}
\item[{\color{red}
\textbf{7536} \textbf{Cablecast Video Overlay app fails to load on system startup}
\textbf{Fixes issues when the Cablecast Video Overlay App starts after a system reboot. The application should now start and function properly after a reboot.}
\item[{\color{red}
\textbf{7540} \textbf{Graphs are sometimes missing in Reporting}
\textbf{Fixed an issue causing broken images in Cablecast Reporting.}
\item[{\color{red}
\textbf{7572} \textbf{Autopilot can hang indefinitely }
\textbf{Fixed a logging issue that would sometimes cause Autopilot sends to hang indefinitely until the machine was restarted.}
\item[{\color{red}
\textbf{7575} \textbf{MPEG2 encoding sometimes fails on SX servers}
\textbf{Fixes an issue encoding MPEG2 video on SX Servers.}
\item[{\color{red}
\textbf{7604} \textbf{CEA-608 closed captioning is not output in HD resolutions}
\textbf{Fixes an issue where closed captions from SD files were not correctly output on HD servers outputting in an HD resolution.}
\end{description}

