\section{Cablecast 5.0.4 Release Notes}
\begin{description}

\item[{\color{red}
\textbf{6453} \textbf{Support for Blackmagic Videohub Ethernet Protocol}
\textbf{This release includes the BlackmagicVHCM with support for Blackmagic Videohub routers using the Ethernet Protocol.  This Control Module currently only address the primary outputs on Video Hub routers.}
\item[{\color{red}
\textbf{6467} \textbf{Wake commands have no effect}
\textbf{Wake commands now fire a play followed by two stops to wake Generic IR devices from sleep.}
\item[{\color{red}
\textbf{6480} \textbf{Previously deleted files are not recognized by Digital File Managment}
\textbf{Files that were once deleted are now picked up when placed back in a content folder.}
\item[{\color{red}
\textbf{6481} \textbf{Cablecast Service can hang indefinitely}
\textbf{Different process in the Cablecast service sometimes could call on the same resource causing the service to hang.}
\item[{\color{red}
\textbf{6484} \textbf{Switches with Take Delays can be delayed}
\textbf{Take delays were calculated twice causing delayed switches.}
\item[{\color{red}
\textbf{6496} \textbf{Deleting files in Digital File Management can delete the wrong file}
\textbf{Deleting files in Digital File Management now uses the exact path of the file, not the showID.}
\item[{\color{red}
\textbf{6532} \textbf{SXEncoder can cause stability issues after numerous encodes}
\textbf{The SX Encoder was starting a monitoring process for each encode which could overwhelm the system after numerous encodes.}
\item[{\color{red}
\textbf{6533} \textbf{SXEncodeMonitor starts on VOD servers creating error messsages.}
\textbf{We no longer start the SXEncodeMonitor on non SX servers.}
\item[{\color{red}
\textbf{6534} \textbf{Some Invalid files can pass validation}
\textbf{File Validation on SX Servers now require h.264 files require have stereo audio and mark reference mov files as invalid.}
\end{description}

