\section{Cablecast 4.8.6 Release Notes}
\begin{description}

\item[{\color{red}
\textbf{5291} \textbf{Cablecast services do not work on 64bit systems}
\textbf{Cablecast will now run on 64bit operating systems}
\item[{\color{red}
\textbf{5292} \textbf{Cablecast web UI needs to install into the Classic .NET AppPool for Windows 2008}
\textbf{Cablecast needs to run as the Classic .NET AppPool on 2008.}
\item[{\color{red}
\textbf{5293} \textbf{System.Threading.ThreadAbortException in TRMS event log when Cablecast service stops}
\textbf{This was an annoying little problem that never cause any system stability issues, it just caused extra entries in the event log.}
\item[{\color{red}
\textbf{5313} \textbf{Installers now kill TRMS.Components.Transcoder.exe on install}
\textbf{THe installers need to close any running Cablecast software before trying to install new files.}
\end{description}

