\section{Cablecast 4.8.2 Release Notes}
\begin{description}

\item[{\color{red}
\textbf{3765} \textbf{.dv files play back without audio if Quicktime 7.6 is installed}
\textbf{An incompatibility was discovered with Quicktime 7.6, the Cablecast installer will now install version 7.5.5.}
\item[{\color{red}
\textbf{3781} \textbf{CodanNKCM}
\textbf{Added a control module for the NK series routers from Codan Broadcast.}
\item[{\color{red}
\textbf{3782} \textbf{Update link of current Cablecast manual to the Help menu option }
\textbf{The help links in Cablecast now send the user to trms.com/support, instead of an outdated manual.}
\item[{\color{red}
\textbf{3810} \textbf{Add write permissions for web server on the Cablecast installer}
\textbf{Resolved an issue that could cause inconsistent timeouts in Cablecast}
\item[{\color{red}
\textbf{3811} \textbf{Encoding with VBI enabled can cause a memory leak and eventually a failure}
\textbf{Encoding VBI now works as expected, and no longer causes issues.}
\item[{\color{red}
\textbf{3812} \textbf{Closed caption data from Cablecast 4.7.x files does not show up on closed captioning decoders}
\textbf{Resolved an error in the positioning of the closed captioning data.}
\item[{\color{red}
\textbf{3825} \textbf{Encoding to a directory that does not exist will cause error}
\textbf{If the directory does not exist, it will now be created automatically.}
\item[{\color{red}
\textbf{3826} \textbf{SXConfiguration application crashes if SX Hardware Control restarts}
\textbf{The SXConfiguration application will now handle restarts of the SX Hardware control.}
\item[{\color{red}
\textbf{3827} \textbf{SX servers output last frame of video after a stop command is sent}
\textbf{SX servers will now output black after a stop command.}
\end{description}

